Jul 19 1994 00:04 Page �

__brk.c

 /* Copyright (C) 1991 Free Software Foundation, Inc.
 This file is part of the GNU C Library.

 The GNU C Library is free software; you can redistribute it and/or
 modify it under the terms of the GNU Library General Public License as
 published by the Free Software Foundation; either version 2 of the
 License, or (at your option) any later version.

 The GNU C Library is distributed in the hope that it will be useful,
 but WITHOUT ANY WARRANTY; without even the implied warranty of
 MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU
 Library General Public License for more details.

 You should have received a copy of the GNU Library General Public
 License along with the GNU C Library; see the file COPYING.LIB.  If
 not, write to the Free Software Foundation, Inc., 675 Mass Ave,
 Cambridge, MA 02139, USA.  */

 #include <ansidecl.h>
 #include <errno.h>

 /* Set the end of the process’s data space to ADDR.
    Return 0 if successful, -1 if not.  */
 int
 DEFUN(__brk, (addr), PTR addr)
 {
   errno = ENOSYS;
   return -1;
 }

 #ifdef   HAVE_GNU_LD

 #include <gnu-stabs.h>

 stub_warning(__brk);

 #endif  /* GNU stabs.  */

__brk.c

Printed by carsten from goedel.cs.uni-sb.de